From 711c7742e232597cdf213b45f7c13eee4e6d6bf8 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Thu, 13 Mar 2014 03:14:50 +0000
Subject: VIRTIO-60: avoid vring and VIRTIO_RING.

These are never introduced, so use simpler names: virtq* for structures
and VIRTIO_ for features.

I added two notes about the old names, for helping people coming from
the old spec.

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@327 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 introduction.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'introduction.tex')

diff --git a/introduction.tex b/introduction.tex
index f8ea424..ac7eefa 100644
--- a/introduction.tex
+++ b/introduction.tex
@@ -38,8 +38,8 @@ between different transports.
 
 \begin{longtable}{l p{5in}}
 	\phantomsection\label{intro:rfc2119}\textbf{[RFC2119]} &
-Bradner S., "Key words for use in RFCs to Indicate Requirement
-Levels", BCP 14, RFC 2119, March 1997. \newline\url{http://www.ietf.org/rfc/rfc2119.txt}\\
+Bradner S., ``Key words for use in RFCs to Indicate Requirement
+Levels'', BCP 14, RFC 2119, March 1997. \newline\url{http://www.ietf.org/rfc/rfc2119.txt}\\
 	\phantomsection\label{intro:S390 PoP}\textbf{[S390 PoP]} & z/Architecture Principles of Operation, IBM Publication SA22-7832, \newline\url{http://publibfi.boulder.ibm.com/epubs/pdf/dz9zr009.pdf}, and any future revisions\\
 	\phantomsection\label{intro:S390 Common I/O}\textbf{[S390 Common I/O]} & ESA/390 Common I/O-Device and Self-Description, IBM Publication SA22-7204, \newline\url{http://publibfp.dhe.ibm.com/cgi-bin/bookmgr/BOOKS/dz9ar501/CCONTENTS}, and any future revisions\\
 	\phantomsection\label{intro:PCI}\textbf{[PCI]} &
-- 
cgit 

